// Module is included in the following assemblies:
//
// * serverless/admin_guide/knative-serving-CR-config.adoc

[id="serverless-https-redirect-global_{context}"]
= HTTPS redirection global settings

You can enable HTTPS redirection for all services on the cluster by configuring the `httpProtocol` spec for the `KnativeServing` custom resource, as shown in the following example:

[source,yaml]
----
apiVersion: operator.knative.dev/v1alpha1
kind: KnativeServing
metadata:
  name: knative-serving
spec:
  config:
    network:
      httpProtocol: "redirected"
...
----
