// Module included in the following assemblies:
//
// * security/file_integrity_operator/file-integrity-operator-understanding.adoc

[id="file-integrity-node-status-types_{context}"]
= `FileIntegrityNodeStatus` status types

These conditions are reported in the results array of the
corresponding `FileIntegrityNodeStatus`:

* `Succeeded` - The integrity check passed; the files and directories
covered by the AIDE check have not been modified since the database was last
initialized.

* `Failed` - The integrity check failed; some files or directories
covered by the AIDE check have been modified since the database was last
initialized.

* `Error` - The AIDE scanner encountered an internal error.
