// Module is included in the following assemblies:
//
// serverless/installing-knative-client.adoc

[id="installing-cli-windows_{context}"]
= Installing the `kn` CLI for Windows

The CLI for Windows is provided as a zip archive.

.Procedure

. Download the link:https://mirror.openshift.com/pub/openshift-v4/clients/serverless/latest[CLI].

. Unzip the archive with a ZIP program.

. Move the `kn` binary to a directory on your PATH.

. To check your PATH, open the Command Prompt and run the command:
+

[source,terminal]
----
C:\> path
----
