// Module is included in the following assemblies:
//
// serverless/knative-client.adoc

[id="installing-cli-web-console_{context}"]
= Installing the `kn` CLI using the {product-title} web console

Once the {ServerlessOperatorName} is installed, you will see a link to download the `kn` CLI for Linux, macOS and Windows from the *Command Line Tools* page in the {product-title} web console.

You can access the *Command Line Tools* page by clicking the image:../images/question-circle.png[title="Help"] icon in the top right corner of the web console and selecting *Command Line Tools* in the drop down menu.

.Procedure

. Download the `kn` CLI from the *Command Line Tools* page.
. Unpack the archive:
+

[source,terminal]
----
$ tar -xf <file>
----

. Move the `kn` binary to a directory on your PATH.

. To check your path, run:
+

[source,terminal]
----
$ echo $PATH
----

+
[NOTE]
====
If you do not use RHEL or Fedora, ensure that *libc* is installed in a directory on your library path.
If *libc* is not available, you might see the following error when you run CLI commands:

[source,terminal]
----
$ kn: No such file or directory
----

====
