// Module included in the following assemblies:
//
// * nodes/nodes/nodes-nodes-working.adoc

:_mod-docs-content-type: PROCEDURE
[id="nodes-control-plane-osp-migrating_{context}"]
= Migrating control plane nodes from one RHOSP host to another manually

[role="_abstract"] 
If control plane machine sets are not enabled on your cluster, you can run a script that moves a control plane node from one {rh-openstack-first} node to another.

[NOTE]
====
Control plane machine sets are not enabled on clusters that run on user-provisioned infrastructure.

For information about control plane machine sets, see "Managing control plane machines with control plane machine sets".
====

.Prerequisites

* The environment variable `OS_CLOUD` refers to a `clouds` entry that has administrative credentials in a `clouds.yaml` file.
* The environment variable `KUBECONFIG` refers to a configuration that contains administrative {product-title} credentials.

.Procedure

* From a command line, run the following script:
+
[source,bash]
----
#!/usr/bin/env bash

set -Eeuo pipefail

if [ $# -lt 1 ]; then
	echo "Usage: '$0 node_name'"
	exit 64
fi

# Check for admin OpenStack credentials
openstack server list --all-projects >/dev/null || { >&2 echo "The script needs OpenStack admin credentials. Exiting"; exit 77; }

# Check for admin OpenShift credentials
oc adm top node >/dev/null || { >&2 echo "The script needs OpenShift admin credentials. Exiting"; exit 77; }

set -x

declare -r node_name="$1"
declare server_id
server_id="$(openstack server list --all-projects -f value -c ID -c Name | grep "$node_name" | cut -d' ' -f1)"
readonly server_id

# Drain the node
oc adm cordon "$node_name"
oc adm drain "$node_name" --delete-emptydir-data --ignore-daemonsets --force

# Power off the server
oc debug "node/${node_name}" -- chroot /host shutdown -h 1

# Verify the server is shut off
until openstack server show "$server_id" -f value -c status | grep -q 'SHUTOFF'; do sleep 5; done

# Migrate the node
openstack server migrate --wait "$server_id"

# Resize the VM
openstack server resize confirm "$server_id"

# Wait for the resize confirm to finish
until openstack server show "$server_id" -f value -c status | grep -q 'SHUTOFF'; do sleep 5; done

# Restart the VM
openstack server start "$server_id"

# Wait for the node to show up as Ready:
until oc get node "$node_name" | grep -q "^${node_name}[[:space:]]\+Ready"; do sleep 5; done

# Uncordon the node
oc adm uncordon "$node_name"

# Wait for cluster operators to stabilize
until oc get co -o go-template='statuses: {{ range .items }}{{ range .status.conditions }}{{ if eq .type "Degraded" }}{{ if ne .status "False" }}DEGRADED{{ end }}{{ else if eq .type "Progressing"}}{{ if ne .status "False" }}PROGRESSING{{ end }}{{ else if eq .type "Available"}}{{ if ne .status "True" }}NOTAVAILABLE{{ end }}{{ end }}{{ end }}{{ end }}' | grep -qv '\(DEGRADED\|PROGRESSING\|NOTAVAILABLE\)'; do sleep 5; done
----
+
If the script completes, the control plane machine is migrated to a new {rh-openstack} node.