// Module included in the following assemblies:
//
// * networking/hardware_networks/configuring-interface-sysctl-sriov-device.adoc

:_mod-docs-content-type: CONCEPT
[id="nw-setting-one-sysctl-flag_{context}"]
= Setting one sysctl flag

You can set interface-level network `sysctl` settings for a pod connected to a SR-IOV network device.

In this example, `net.ipv4.conf.IFNAME.accept_redirects` is set to `1` on the created virtual interfaces.

The `sysctl-tuning-test` is a namespace used in this example.

* Use the following command to create the `sysctl-tuning-test` namespace:
+
----
$ oc create namespace sysctl-tuning-test
----

