// Module included in the following assemblies:
//
// * argo-cd-custom-resource-properties.adoc

:_mod-docs-content-type: PROCEDURE
[id="command-line-tool_{context}"]
= Argo CD CLI tool

[role="_abstract"]
The Argo CD CLI tool is a tool used to configure Argo CD through the command line. {gitops-title} does not support this binary. Use the OpenShift Console to configure the Argo CD.

