// Module included in the following assemblies:
//
// * microshift_troubleshooting/microshift-version.adoc

:_content-type: PROCEDURE
[id="microshift-version-cli_{context}"]
= Checking the {microshift-short} version using the command-line interface

To begin troubleshooting, you must know your {microshift-short} version. One way to get this information is by using the CLI.

.Procedure

* Run the following command to check the version information:
+
[source,terminal]
----
$ microshift version
----
+
.Example output
[source,terminal,subs="attributes+"]
----
{product-title} Version: {product-version}-0.microshift-e6980e25
Base OCP Version: {product-version}
----
