// Module included in the following assemblies:
//
// * hardware_accelerators/about-hardware-accelerators.adoc

:_mod-docs-content-type: CONCEPT
[id="nvidia-gpu-enablement_{context}"]
= NVIDIA GPU enablement

The following diagram shows how the GPU architecture is enabled for OpenShift:


.NVIDIA GPU enablement
image::512_OpenShift_NVIDIA_GPU_enablement_1223.png[NVIDIA GPU enablement]

[NOTE]
====
MIG is supported on GPUs starting with the NVIDIA Ampere generation. For a list of GPUs that support MIG, see the link:https://docs.nvidia.com/datacenter/tesla/mig-user-guide/#supported-gpus[NVIDIA MIG User Guide].
====
