// Module included in the following assemblies:
//
// backup_and_restore/application_backup_and_restore/oadp-api.adoc
:_mod-docs-content-type: REFERENCE

[id="datamover-type_{context}"]
= DataMover type

[role="_abstract"]
The following are `DataMover` {oadp-short} APIs:

.DataMover
[options="header"]
|===
|Property|Type|Description

|`enable`
|link:https://pkg.go.dev/builtin#bool[bool]
|If set to `true`, deploys the volume snapshot mover controller and a modified CSI Data Mover plugin. If set to `false`, these are not deployed.

|`credentialName`
|link:https://pkg.go.dev/builtin#string[string]
|User-supplied Restic `Secret` name for Data Mover.

|`timeout`
|link:https://pkg.go.dev/builtin#string[string]
|A user-supplied duration string for `VolumeSnapshotBackup` and `VolumeSnapshotRestore` to complete. Default is `10m` (10 minutes). A duration string is a possibly signed sequence of decimal numbers, each with optional fraction and a unit suffix, such as `300ms`, `-1.5h`, or `2h45m`. Valid time units are `ns`, `us` (or `µs`), `ms`, `s`, `m`, and `h`.
|===