// Module included in the following assemblies:
//
// * serverless/admin_guide/serverless-configuration.adoc

:_content-type: REFERENCE
[id="serverless-https-redirect-global_{context}"]
= HTTPS redirection global settings

HTTPS redirection provides redirection for incoming HTTP requests. These redirected HTTP requests are encrypted. You can enable HTTPS redirection for all services on the cluster by configuring the `httpProtocol` spec for the `KnativeServing` custom resource (CR).

.Example `KnativeServing` CR that enables HTTPS redirection
[source,yaml]
----
apiVersion: operator.knative.dev/v1alpha1
kind: KnativeServing
metadata:
  name: knative-serving
spec:
  config:
    network:
      httpProtocol: "redirected"
...
----
