// Module included in the following assemblies:
//
// * rosa_cluster_admin/cloud_infrastructure_access/dedicated-aws-private-cluster.adoc

:_mod-docs-content-type: PROCEDURE
[id="dedicated-enable-public-cluster"]
= Enabling public cluster on a private cluster

You can set a private cluster to public facing:

.Procedure

. Access your cluster in {cluster-manager-first}.
. Navigate to the *Networking* tab.
. Deselect *Make API private* under *Master API endpoint* and click *Change settings*.
+
[NOTE]
====
Transitioning your cluster between private and public can take several minutes to complete.
====
