:_mod-docs-content-type: ASSEMBLY
[id="microshift-oc-cli-install"]
= Getting started with the OpenShift CLI
include::_attributes/attributes-microshift.adoc[]
:context: microshift-oc-cli-install

toc::[]

To use the {oc-first} tool, you must download and install it separately from your {microshift-short} installation. You can install `oc` by downloading the binary or by using Homebrew.

// Installing the CLI by downloading the binary
include::modules/cli-installing-cli.adoc[leveloffset=+1]

// Installing the CLI by using Homebrew
include::modules/cli-installing-cli-brew.adoc[leveloffset=+1]

// Installing the CLI using RPM
include::modules/cli-installing-cli-rpm.adoc[leveloffset=+1]