:_mod-docs-content-type: ASSEMBLY
[id="load-balancing-openstack"]
= Load balancing on {rh-openstack}
include::_attributes/common-attributes.adoc[]
:context: load-balancing-openstack

toc::[]

include::modules/nw-osp-loadbalancer-limitations.adoc[leveloffset=+1]
include::modules/nw-osp-loadbalancer-etp-local.adoc[leveloffset=+2]
include::modules/installation-osp-api-octavia.adoc[leveloffset=+1]
include::modules/installation-osp-api-scaling.adoc[leveloffset=+2]

// Services for a user-managed load balancer
include::modules/nw-osp-services-external-load-balancer.adoc[leveloffset=+1]

// Configuring a user-managed load balancer
include::modules/nw-osp-configuring-external-load-balancer.adoc[leveloffset=+2]
