// Module included in the following assemblies:
//
// * microshift_troubleshooting/microshift-version.adoc
// * microshift_support/microshift-etcd.adoc

:_mod-docs-content-type: PROCEDURE
[id="microshift-version-etcd_{context}"]
= Checking the etcd version

You can get the version information for the etcd database included with your {microshift-short} by using one or both of the following methods, depending on the level of information that you need.

.Procedure

* To display the base database version information, run the following command:
+
[source,terminal]
----
$ microshift-etcd version
----
+
.Example output
[source,terminal,subs="attributes+"]
----
microshift-etcd Version: 4.17.1
Base etcd Version: 3.5.13
----

* To display the full database version information, run the following command:
+
[source,terminal]
----
$ microshift-etcd version -o json
----
+
.Example output
[source,terminal,subs="attributes+"]
----
{
  "major": "4",
  "minor": "16",
  "gitVersion": "4.17.1~rc.1",
  "gitCommit": "140777711962eb4e0b765c39dfd325fb0abb3622",
  "gitTreeState": "clean",
  "buildDate": "2024-05-10T16:37:53Z",
  "goVersion": "go1.21.9"
  "compiler": "gc",
  "platform": "linux/amd64",
  "patch": "",
  "etcdVersion": "3.5.13"
}
----