// Module is included in the following assemblies:
//
// * serverless/knative_serving/serverless-applications.adoc

[id="serverless-https-redirect-service_{context}"]
= HTTPS redirection per service

You can enable or disable HTTPS redirection for a service by configuring the `networking.knative.dev/httpOption` annotation, as shown in the following example:

[source,yaml]
----
apiVersion: serving.knative.dev/v1
kind: Service
metadata:
  name: example
  namespace: default
  annotations:
    networking.knative.dev/httpOption: "redirected"
spec:
  ...
----
