:_mod-docs-content-type: ASSEMBLY
[id="cert-manager-log-levels"]
= Configuring log levels for cert-manager and the {cert-manager-operator}
include::_attributes/common-attributes.adoc[]
:context: cert-manager-log-levels

toc::[]

[role="_abstract"]
To troubleshoot issues with the cert-manager components and the {cert-manager-operator}, you can configure the log level verbosity.

[NOTE]
====
To use different log levels for different cert-manager components, see _Customizing cert-manager Operator API fields_.
====

include::modules/cert-manager-enable-operand-log-level.adoc[leveloffset=+1]

include::modules/cert-manager-enable-operator-log-level.adoc[leveloffset=+1]

[role="_additional-resources"]
[id="cert-manager-log-levels_additional-resources"]
== Additional resources

* xref:../../security/cert_manager_operator/cert-manager-customizing-api-fields.adoc#cert-manager-customizing-api-fields[Customizing cert-manager Operator API fields]
