:_mod-docs-content-type: ASSEMBLY
[id="audit-log-policy-config"]
= Configuring the audit log policy
include::_attributes/common-attributes.adoc[]
:context: audit-log-policy-config

toc::[]

You can control the amount of information that is logged to the API server audit logs by choosing the audit log policy profile to use.

// About audit log profiles
include::modules/nodes-nodes-audit-config-about.adoc[leveloffset=+1]

// Configuring the audit log policy
include::modules/nodes-nodes-audit-policy.adoc[leveloffset=+1]

// Configuring the audit log policy with custom rules
include::modules/nodes-nodes-audit-policy-custom.adoc[leveloffset=+1]

// Disabling audit logging
include::modules/nodes-nodes-audit-policy-disable.adoc[leveloffset=+1]
