// Module included in the following assemblies:
//
// * rosa_getting_started/rosa-getting-started.adoc
// * rosa_getting_started/rosa-quickstart-guide-ui.adoc

:_mod-docs-content-type: PROCEDURE
[id="rosa-getting-started-access-cluster-web-console_{context}"]
= Accessing a cluster through the web console

ifeval::["{context}" == "rosa-getting-started"]
:getting-started:
endif::[]
ifeval::["{context}" == "rosa-quickstart"]
:quickstart:
endif::[]

After you have created a cluster administrator user or added a user to your configured identity provider, you can log into your {product-title} cluster through the web console.

ifdef::getting-started[]
.Prerequisites

* You have an AWS account.
* You installed and configured the latest ROSA CLI, `rosa`, on your workstation.
* You logged in to your Red{nbsp}Hat account using the ROSA CLI (`rosa`).
* You created a {product-title} cluster.
* You have created a cluster administrator user or added your user account to the configured identity provider.
endif::[]

.Procedure

. Obtain the console URL for your cluster:
+
[source,terminal]
----
$ rosa describe cluster -c <cluster_name> | grep Console <1>
----
<1> Replace `<cluster_name>` with the name of your cluster.
+
.Example output
[source,terminal]
----
Console URL:                https://console-openshift-console.apps.example-cluster.wxyz.p1.openshiftapps.com
----

. Go to the console URL in the output of the preceding step and log in.
+
* If you created a `cluster-admin` user, log in by using the provided credentials.
* If you configured an identity provider for your cluster, select the identity provider name in the *Log in with...* dialog and complete any authorization requests that are presented by your provider.

ifeval::["{context}" == "rosa-getting-started"]
:getting-started:
endif::[]
ifeval::["{context}" == "rosa-quickstart"]
:quickstart:
endif::[]
