// Module included in the following assemblies:
//
// * security/nbde_tang_server_operator/nbde-tang-server-operator-installing.adoc

:_mod-docs-content-type: PROCEDURE
[id="installing-nbde-tang-server-operator-using-web-console_{context}"]
= Installing the NBDE Tang Server Operator using the web console

You can install the NBDE Tang Server Operator from the software catalog using the web console.

.Prerequisites

* You must have `cluster-admin` privileges on an {product-title} cluster.

.Procedure

. In the {product-title} web console, navigate to *Ecosystem* -> *Software Catalog*.
. Search for the NBDE Tang Server Operator:
+
image::nbde-tang-server-operator-01-operatorhub.png[NBDE Tang Server Operator in the software catalog]
. Click *Install*.
. On the *Operator Installation* screen, keep the *Update channel*, *Version*, *Installation mode*, *Installed Namespace*, and *Update approval* fields on the default values. 
. After you confirm the installation options by clicking *Install*, the console displays the installation confirmation.
+
image::nbde-tang-server-operator-03-confirmation.png[Confirmation of a NBDE Tang Server Operator installation]

.Verification

. Navigate to the *Ecosystem* -> *Installed Operators* page.
. Check that the NBDE Tang Server Operator is installed and its status is `Succeeded`.
+
image::nbde-tang-server-operator-05-succeeded.png[NBDE Tang Server Operator status]

