// Module included in the following assemblies:
//
// * monitoring/troubleshooting-monitoring-issues.adoc

:_mod-docs-content-type: REFERENCE
[id="resolving-the-alertmanagerreceiversnotconfigured-alert_{context}"]
= Resolving the AlertmanagerReceiversNotConfigured alert

Every cluster that is deployed has the `AlertmanagerReceiversNotConfigured` alert firing by default. To resolve the issue, you must configure alert receivers.

* For default platform monitoring, follow the steps in "Configuring alert notifications" in _Configuring core platform monitoring_.

* For user workload monitoring, follow the steps in "Configuring alert notifications" in _Configuring user workload monitoring_.