// Module included in the following assemblies:
//
// * osd_cluster_admin/osd_private_connections/private-cluster.adoc

:_mod-docs-content-type: PROCEDURE
[id="enable-public-cluster_{context}"]
= Enabling an existing private cluster to be public

// TODO: These wordings of "enabling the cluster "to be public/private" could probably be improved. At the very least, these two modules should probably use "Configuring" instead of "Enabling", as it is worded now.

After a private cluster has been created, you can later enable the cluster to be public.

.Procedure

. Log in to {cluster-manager-url}.

. Select the private cluster you would like to make public.

. On the *Networking* tab, deselect *Make API private* under *Control Plane API endpoint*.

. Click *Change settings*.
+
[NOTE]
====
Transitioning your cluster between private and public can take several minutes to complete.
====
