// Module is included in the following assemblies:
//
// * web_console/web_terminal/configuring-web-terminal.adoc

:_mod-docs-content-type: PROCEDURE

[id="configure-web-terminal-timeout-admin_{context}"]
= Configuring the web terminal timeout for all users

You can use the *Administrator* perspective of the web console to set the default web terminal timeout period for all users.

.Prerequisites

* You have cluster administrator permissions and are logged in to the web console.
* You have installed the {web-terminal-op}.

include::snippets/access-cluster-configuration-console.adoc[]

. Click the *Web Terminal* tab, which opens the *Web Terminal Configuration* page.
. Set a value for the timeout. From the drop-down list, select a time interval of *Seconds*, *Minutes*, *Hours*, or *Milliseconds*.
. Click *Save*.